Title: EN_Basic training design software

In this course you will learn the basics of

- Adobe Photoshop
- Adobe Illustrator
- Adobe Indesign

Role: Õppija/Student — Students generally have less privileges within a course.

Section 1
  Teated õppijatele / News Forum
0. Graphic Design
  Around graphic design
  Vector and Pixel Graphics
  The application of vectors and pixels in graphic design
1. Photoshop (12 UC)
  1.1. Getting started with Photoshop (30 min)
  1.2. Adjust - Make image corrections (240 min)
  1.3. Retouch images (70 min)
  1.4. Create photomontages (140 min)
  1.5. Photoshop as a tool for digital painting (190 min)
  The A to Z of Adobe Photoshop
2. Illustrator (10UC)
  2.1. Beginning Illustrator
  2.2. The first steps in Illustrator
  2.3. Creating shapes
  2.4. Creating texts
  2.5. Work with colour in Illustrator
  2.6. Working with layers in Illustrator
  2.7. Saving, exporting and file formats
  Summerizing files
  2.8. Exercises to practise Illustrator
  The A to Z of Adobe Illustrator
3. InDesign
  Introduction: What you can create with Adobe InDes...
  The primary tools to work with InDesignOpen your p...
  Files in InDesign
  The A to Z of Adobe InDesign
And what else
  Comparison of graphic file formats
Section 7